Hist_1 Entries 8192 Mean 484.1 RMS 103

Energy, keV

350 400 450 500 550 600 650 700 counts

0 100 200 300 400 500 600 700 310 × Hist_1

Hist_2 Entries 8192 Mean 513.8 RMS 99.23

Energy, keV

350 400 450 500 550 600 650 700 counts

500 1000

1500

2000

2500

3000

3500

4000

4500 Hist_2

Hist_2

Hist_D Entries 8192 Mean 492.5 RMS 107.1

Energy, keV

350 400 450 500 550 600 650 700 counts

0 100 200 300 400 500 600 700 800 900 Hist_D

Hist_D