ECTotal/P

Entries 127719 Mean 0.2772 RMS 0.04239 Underflow 0 Overflow 0 Integral 1.277e+05

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 2000

4000

6000

8000

10000

12000

14000

16000 ECTotal/P_{Entries 127719}

ECTotal/P