ENDF 2013-May-27,22:52:48

Incident Energy (MeV)

Cross Section (barns)

ENDF/B-VII.0: U-233(N,F) ENDF/B-VII.1: U-233(N,F) JEFF-3.1: U-233(N,F) JENDL-3.3: U-233(N,F) ENDF/B-VI.8: U-233(N,F) ENDF/B-V.2: U-233(N,F) ROSFOND-2010: U-233(N,F) CENDL-3.1: U-233(N,F)